4500 5000 5500 6000 6500 7000 7500 8000 0

2

4

6 x 10^{-15}

Spectrum of SN 2001X in NGC 5921 (IIp) (Wise Observatory 1m telescope + Fosc, 22/3/2001)

Restframe wavelength [ang.]

Flux [erg/sec/cm 2/ang.]

Dotted: Wise spectrum of SN 2001X

Bold: Spectrum of SN 1992H (type IIp) at 34 days past maximum (from Filippenko 1997)