3000 4000 5000 6000 7000 8000 9000 0

2

4

6 x 10^{-15} Spectrum of SN 2001G (z = 0.015)

Wave length [Ang.]

Flux [erg/sec/cm2/Ang]

Bold: Restframe Wise spectrum of SN 2001G

Dotted: Restframe spectrum of type Ia SN 1994D at two days from maximum light, from Filippenko 1997