740 760 780 800 820 840 860

13 13.5 14 14.5 15 15.5 16 16.5 17 17.5 18

14/7/2000

27/7/2000

10/8/2000

23/8/2000

5/9/2000

19/9/2000

2/10/2000

15/10/2000

29/10/2000

11/11/2000

JD - 2451000

Magnitude

I-band

R-band

V-band

B-band

U-band